LIBRARY     SSTVENG.DLL

EXPORTS
    mmsAdjustPhase                 @51  
    mmsCopyDIB                     @52  
    mmsCorrectSlant                @53  
    mmsCreate                      @54  
    mmsCreateDIB                   @55  
    mmsDelete                      @56  
    mmsDeleteDIB                   @57  
    mmsDisableOption               @58  
    mmsDoJob                       @59  
    mmsDrawDCbmp                   @60  
    mmsDrawDIBbmp                  @61  
    mmsDrawDIBdc                   @62  
    mmsDrawDIBwnd                  @63  
    mmsDrawTransDIBbmp             @64  
    mmsDrawTransDIBdc              @65  
    mmsFillDIB                     @66  
    mmsGetAFCFQ                    @67  
    mmsGetClearColor               @68  
    mmsGetDIBSize                  @69  
    mmsGetFSKID                    @70  
    mmsGetImageSize                @71  
    mmsGetLevel                    @72  
    mmsGetMode                     @73  
    mmsGetModeLength               @74  
    mmsGetModeName                 @75  
    mmsGetModeSize                 @76  
    mmsGetModeTiming               @77  
    mmsGetPos                      @78  
    mmsGetRadioFreq                @79  
    mmsGetRepSQ                    @80  
    mmsGetSampleFreq               @81  
    mmsGetSpec                     @82  
    mmsGetSpecDraw                 @83  
    mmsGetSpecPersistence          @84  
    mmsGetVersion                  @85  
    mmsGetWWVFQ                    @86  
    mmsLanguage                    @87  
    mmsLoadDIB                     @88  
    mmsOption                      @89  
    mmsPasteDIB                    @90  
    mmsReSync                      @91  
    mmsSaveDIB                     @92  
    mmsSendCWID                    @93  
    mmsSendPic                     @94  
    mmsSendStop                    @95  
    mmsSendTone                    @96  
    mmsSetBitmap                   @97  
    mmsSetCWID                     @98  
    mmsSetCWIDCallback             @99  
    mmsSetClearColor               @100 
    mmsSetFSKID                    @101 
    mmsSetHDC                      @102 
    mmsSetMessage                  @103 
    mmsSetNotch                    @104 
    mmsSetOptionTitle              @105 
    mmsSetPTT                      @106 
    mmsSetPTTPort                  @107 
    mmsSetParent                   @108 
    mmsSetRadioPort                @109 
    mmsSetRepeater                 @110 
    mmsSetRxControl                @111 
    mmsSetSampleFreq               @112 
    mmsSetSpecColor                @113 
    mmsSetSpecRange                @114 
    mmsSetTuneBitmap               @115 
    mmsSetTuneControl              @116 
    mmsSetTxControl                @117 
    mmsSetWaterColor               @118 
    mmsStart                       @119 
    mmsStartScan                   @120 
    mmsStop                        @121 
    mmsStopScan                    @122 
    mmsStrCopy                     @123 
    mmsStrWCopy                    @124 
